� � �

-0.03 -0.02 -0.01 0.00 0.01 0.02 0.03

Metformin+Insulin vs. Placebo+Insulin

Placebo+Insulin 18m - baseline

Metformin+Insulin 18m - baseline

Improvement Deterioration

Mean carotid IMT (mm)