Months since trial entry

HbA_{1c} (%) [Mean (95% CI)]

0 3 6 9 12 15 18 7

8

9

10 Biphasic Aspart+Detemir Detemir

Change from baseline

-1.0

-0.4

-0.3

a

Months since trial entry

Fasting p-glucose (mmol/L) [Mean (95% CI)]

0 3 6 9 12 15 18 7

9

11

Biphasic Aspart+Detemir

Detemir

Change from baseline

-2.0 -1.3

-2.4

b

Months since trial entry

Insulin dose (IU/day/kg) [Mean (95% CI)]

0 3 6 9 12 15 18 0

1

2 Biphasic Aspart+Detemir Detemir

% change from baseline

95.9

126.9

236.8

c

Months since trial entry

Weight (kg) [Mean (95% CI)]

0 3 6 9 12 15 18 90

100

110

120 Biphasic Aspart+Detemir

Detemir

Change from baseline

3.3 3.2 1.9

d